Reaction :^9Be(p,n)^9B

The experimental data from GI59 are used from threshold (Q = �1.851 MeV) to E = 3.5 MeV. For E ˘ 4.8 MeV, the relative yield data of BA64 are adopted, after normalization to the value σ = 0.511 b at E = 4.33 MeV from GI59. In the intermediate region, the χ^2 average of both data sets is adopted. In GI59, the total error is 5%, and includes uncertainties in detector efficiency and target thickness. In BA64, the corresponding error is 8%. The recommended reaction rates are in good agreement with the CA88 ones.

T9 low adopt high exp ratio T9 low adopt high exp ratio T9 low adopt high exp ratio

0.3 5.49 5.84 6.07 -24 1.0 0.9 4.21 4.44 4.65 -3 0.9 3.5 5.30 5.58 5.86 5 0.9 0.35 1.58 1.68 1.75 -19 1.0 1 4.84 5.11 5.36 -2 0.9 4 1.25 1.32 1.38 6 0.9 0.4 3.52 3.73 3.89 -16 1.0 1.25 4.08 4.30 4.52 0 0.9 5 4.26 4.50 4.74 6 0.9 0.45 1.42 1.50 1.57 -13 1.0 1.5 8.13 8.56 8.99 1 0.9 6 0.99 1.05 1.11 7 0.9 0.5 1.72 1.82 1.91 -11 1.0 1.75 7.03 7.40 7.77 2 0.9 7 1.85 1.95 2.07 7 0.9 0.6 2.34 2.48 2.59 -8 1.0 2 3.59 3.78 3.97 3 0.9 8 2.98 3.16 3.34 7 0.9 0.7 4.11 4.34 4.55 -6 0.9 2.5 3.61 3.80 3.99 4 0.9 9 4.35 4.62 4.90 7 0.9 0.8 2.01 2.13 2.23 -4 0.9 3 1.71 1.81 1.90 5 0.9 10 5.93 6.30 6.70 7 0.9